---
title: "ImageGenerationRequestProvider"
---

Provider-specific passthrough configuration


## Fields

| Field                                                                                                | Type                                                                                                 | Required                                                                                             | Description                                                                                          | Example                                                                                              |
| ---------------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------------- |
| `options`                                                                                            | [Optional[components.ImageGenerationRequestOptions]](../components/imagegenerationrequestoptions.mdx) | :heavy_minus_sign:                                                                                   | N/A                                                                                                  | \{<br/>"black-forest-labs": \{<br/>"guidance": 3,<br/>"steps": 40<br/>}<br/>}                          |