---
title: "OpenAIResponseCustomToolCallOutput"
---

## Fields

| Field                                                                                                              | Type                                                                                                               | Required                                                                                                           | Description                                                                                                        |
| ------------------------------------------------------------------------------------------------------------------ | ------------------------------------------------------------------------------------------------------------------ | ------------------------------------------------------------------------------------------------------------------ | ------------------------------------------------------------------------------------------------------------------ |
| `call_id`                                                                                                          | *str*                                                                                                              | :heavy_check_mark:                                                                                                 | N/A                                                                                                                |
| `id`                                                                                                               | *Optional[str]*                                                                                                    | :heavy_minus_sign:                                                                                                 | N/A                                                                                                                |
| `output`                                                                                                           | [components.OpenAIResponseCustomToolCallOutputOutput2](../components/openairesponsecustomtoolcalloutputoutput2.mdx) | :heavy_check_mark:                                                                                                 | N/A                                                                                                                |
| `type`                                                                                                             | [components.OpenAIResponseCustomToolCallOutputType](../components/openairesponsecustomtoolcalloutputtype.mdx)       | :heavy_check_mark:                                                                                                 | N/A                                                                                                                |