---
title: "OpenAIResponseFunctionToolCallOutput"
---

## Fields

| Field                                                                                                                                  | Type                                                                                                                                   | Required                                                                                                                               | Description                                                                                                                            | Example                                                                                                                                |
| -------------------------------------------------------------------------------------------------------------------------------------- | -------------------------------------------------------------------------------------------------------------------------------------- | -------------------------------------------------------------------------------------------------------------------------------------- | -------------------------------------------------------------------------------------------------------------------------------------- | -------------------------------------------------------------------------------------------------------------------------------------- |
| `call_id`                                                                                                                              | *str*                                                                                                                                  | :heavy_check_mark:                                                                                                                     | N/A                                                                                                                                    |                                                                                                                                        |
| `id`                                                                                                                                   | *OptionalNullable[str]*                                                                                                                | :heavy_minus_sign:                                                                                                                     | N/A                                                                                                                                    |                                                                                                                                        |
| `output`                                                                                                                               | [components.OpenAIResponseFunctionToolCallOutputOutput2](../components/openairesponsefunctiontoolcalloutputoutput2.mdx)                 | :heavy_check_mark:                                                                                                                     | N/A                                                                                                                                    |                                                                                                                                        |
| `status`                                                                                                                               | [OptionalNullable[components.OpenAIResponseFunctionToolCallOutputStatus]](../components/openairesponsefunctiontoolcalloutputstatus.mdx) | :heavy_minus_sign:                                                                                                                     | N/A                                                                                                                                    | completed                                                                                                                              |
| `type`                                                                                                                                 | [components.OpenAIResponseFunctionToolCallOutputType](../components/openairesponsefunctiontoolcalloutputtype.mdx)                       | :heavy_check_mark:                                                                                                                     | N/A                                                                                                                                    |                                                                                                                                        |