---
title: "RangeCapability"
---

A parameter that accepts any value within an inclusive numeric range.


## Fields

| Field                                                                  | Type                                                                   | Required                                                               | Description                                                            |
| ---------------------------------------------------------------------- | ---------------------------------------------------------------------- | ---------------------------------------------------------------------- | ---------------------------------------------------------------------- |
| `max`                                                                  | *float*                                                                | :heavy_check_mark:                                                     | N/A                                                                    |
| `min`                                                                  | *float*                                                                | :heavy_check_mark:                                                     | N/A                                                                    |
| `type`                                                                 | [components.RangeCapabilityType](../components/rangecapabilitytype.mdx) | :heavy_check_mark:                                                     | N/A                                                                    |