---
title: "ResponseHealingPlugin"
---

## Fields

| Field                                                                                   | Type                                                                                    | Required                                                                                | Description                                                                             |
| --------------------------------------------------------------------------------------- | --------------------------------------------------------------------------------------- | --------------------------------------------------------------------------------------- | --------------------------------------------------------------------------------------- |
| `enabled`                                                                               | *Optional[bool]*                                                                        | :heavy_minus_sign:                                                                      | Set to false to disable the response-healing plugin for this request. Defaults to true. |
| `id`                                                                                    | [components.ResponseHealingPluginID](../components/responsehealingpluginid.mdx)          | :heavy_check_mark:                                                                      | N/A                                                                                     |