---
title: "ShellCallStatus"
---

Status of a shell call or its output.

## Example Usage

```python
from openrouter.components import ShellCallStatus

# Open enum: unrecognized values are captured as UnrecognizedStr
value: ShellCallStatus = "in_progress"
```


## Values

This is an open enum. Unrecognized values will not fail type checks.

- `"in_progress"`
- `"completed"`
- `"incomplete"`
