---
title: "InternalServerResponseError"
---

Internal Server Error - Unexpected server error


## Fields

| Field                                                                                          | Type                                                                                           | Required                                                                                       | Description                                                                                    | Example                                                                                        |
| ---------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------- | ---------------------------------------------------------------------------------------------- |
| `error`                                                                                        | [components.InternalServerResponseErrorData](../components/internalserverresponseerrordata.mdx) | :heavy_check_mark:                                                                             | Error data for InternalServerResponse                                                          | \{<br/>"code": 500,<br/>"message": "Internal Server Error"<br/>}                                |
| `openrouter_metadata`                                                                          | Dict[str, *Nullable[Any]*]                                                                     | :heavy_minus_sign:                                                                             | N/A                                                                                            |                                                                                                |
| `user_id`                                                                                      | *OptionalNullable[str]*                                                                        | :heavy_minus_sign:                                                                             | N/A                                                                                            |                                                                                                |