---
title: "ImageGenStreamErrorEvent"
---

Emitted when streaming generation fails after the SSE response starts


## Fields

| Field                                                                                      | Type                                                                                       | Required                                                                                   | Description                                                                                |
| ------------------------------------------------------------------------------------------ | ------------------------------------------------------------------------------------------ | ------------------------------------------------------------------------------------------ | ------------------------------------------------------------------------------------------ |
| `error`                                                                                    | [components.ImageGenStreamErrorEventError](../components/imagegenstreamerroreventerror.mdx) | :heavy_check_mark:                                                                         | Provider error details                                                                     |
| `type`                                                                                     | [components.ImageGenStreamErrorEventType](../components/imagegenstreamerroreventtype.mdx)   | :heavy_check_mark:                                                                         | The event type                                                                             |