---
title: "FusionCallPanelFailedEvent"
---

Emitted when a fusion panel model fails.


## Fields

| Field                                                                                        | Type                                                                                         | Required                                                                                     | Description                                                                                  |
| -------------------------------------------------------------------------------------------- | -------------------------------------------------------------------------------------------- | -------------------------------------------------------------------------------------------- | -------------------------------------------------------------------------------------------- |
| `error`                                                                                      | *str*                                                                                        | :heavy_check_mark:                                                                           | N/A                                                                                          |
| `item_id`                                                                                    | *str*                                                                                        | :heavy_check_mark:                                                                           | N/A                                                                                          |
| `model`                                                                                      | *str*                                                                                        | :heavy_check_mark:                                                                           | N/A                                                                                          |
| `output_index`                                                                               | *int*                                                                                        | :heavy_check_mark:                                                                           | N/A                                                                                          |
| `sequence_number`                                                                            | *int*                                                                                        | :heavy_check_mark:                                                                           | N/A                                                                                          |
| `status_code`                                                                                | *Optional[int]*                                                                              | :heavy_minus_sign:                                                                           | N/A                                                                                          |
| `type`                                                                                       | [components.FusionCallPanelFailedEventType](../components/fusioncallpanelfailedeventtype.mdx) | :heavy_check_mark:                                                                           | N/A                                                                                          |