---
title: "SearchModelsServerToolConfig"
---

Configuration for the openrouter:experimental__search_models server tool


## Fields

| Field                                                      | Type                                                       | Required                                                   | Description                                                | Example                                                    |
| ---------------------------------------------------------- | ---------------------------------------------------------- | ---------------------------------------------------------- | ---------------------------------------------------------- | ---------------------------------------------------------- |
| `max_results`                                              | *Optional[int]*                                            | :heavy_minus_sign:                                         | Maximum number of models to return. Defaults to 5, max 20. | 5                                                          |